# 対象の汎用フィールドを指定します。
$bw_field1 = "field_1" ;
$bw_field2 = "field_2" ;
$bw_field3 = "field_3" ;
$bw_field4 = "field_4" ;
$bw_field5 = "field_5" ;
$bw_field6 = "field_15" ;
-----
